\documentclass[10pt]{article}
\usepackage[english]{babel}
% \usepackage[a4paper,top=2cm,bottom=2cm,left=2cm,right=2cm,marginparwidth=1.75cm]{geometry}
\usepackage[a4paper, total={7in, 10in}]{geometry}
\usepackage{multicol}
\usepackage{lipsum}
\usepackage{graphicx}

\graphicspath{{images/}}

\title{B00st converter}

\author{
    van Iterson, Arne\\
    Student Number: 1800000
    \and
    Selier, Tom\\
    Student Number: 1808444
  }

\begin{document}
\maketitle
\begin{multicols}{2}
  \section{Introduction}
    \lipsum[1-2]

  \section{Circuit Description}
    \lipsum[3-4]

  \section{Methodology}
  To characterize the system, several tests have been performed. The 
  characteristics of interest are the following:
    \begin{enumerate}
        \item Efficiency
        \item Noise
        \item Ripple characteristics
        \item Transients
    \end{enumerate}

  Each of these characteristics have been tested at two different output voltages
  and load currents. The different voltages are $7V$ and $3.3V$. The chosen load
  currents are $10$, $20$, $30$, $40$ and $50 mA$. These values were chosen to 
  give characterize the circuit over a broad range of conditions. 

\section{Results}

\section{Conclusion}
\end{multicols}
\end{document}